---
title: "v1.3.11"
description: "v1.3.11 changelog"
---
<Tabs>
  <Tab title="NPX">
    ```bash
    npx -y @maximhq/bifrost --transport-version v1.3.11
    ```
  </Tab>
  <Tab title="Docker">
    ```bash
    docker pull maximhq/bifrost:v1.3.11
    docker run -p 8080:8080 maximhq/bifrost:v1.3.11
    ```
  </Tab>
</Tabs>

<Update label="Bifrost(HTTP)" description="v1.3.11">

- chore: version update core to 1.2.14 and framework to 1.1.16
- feat: added `/v1/models` endpoint to list models of configured providers

</Update>
<Update label="Core" description="v1.3.11">

- feat: added ListModels method to Provider interface
- feat: enabled provider tracking in Bifrost core for API exposure

</Update>
<Update label="Framework" description="v1.3.11">

- chore: version update core to 1.2.14

</Update>
<Update label="governance" description="v1.3.11">

- chore: version update core to 1.2.14 and framework to 1.1.16

</Update>
<Update label="jsonparser" description="v1.3.11">

- chore: version update core to 1.2.14 and framework to 1.1.16

</Update>
<Update label="logging" description="v1.3.11">

- chore: version update core to 1.2.14 and framework to 1.1.16

</Update>
<Update label="maxim" description="v1.3.11">

- chore: version update core to 1.2.14 and framework to 1.1.16

</Update>
<Update label="mocker" description="v1.3.11">

- chore: version update core to 1.2.14 and framework to 1.1.16

</Update>
<Update label="otel" description="v1.3.11">

- chore: version update core to 1.2.14 and framework to 1.1.16

</Update>
<Update label="semantic_cache" description="v1.3.11">

- chore: version update core to 1.2.14 and framework to 1.1.16

</Update>
<Update label="telemetry" description="v1.3.11">

- chore: version update core to 1.2.14 and framework to 1.1.16

</Update>
