---
title: "Run Your Own Benchmarks"
description: "Step-by-step guide to benchmark Bifrost in your own environment using the official benchmarking tool."
icon: "stopwatch"
---

## Overview

Want to see Bifrost's performance in your specific environment? The [**Bifrost Benchmarking Repository**](https://github.com/maximhq/bifrost-benchmarking) provides everything you need to conduct comprehensive performance tests tailored to your infrastructure and workload requirements.

**What You Can Test:**
- **Custom Instance Sizes** - Test on your preferred AWS/GCP/Azure instances  
- **Your Workload Patterns** - Use your actual request/response sizes
- **Different Configurations** - Compare various Bifrost settings
- **Provider Comparisons** - Benchmark against other AI gateways
- **Load Scenarios** - Test burst loads, sustained traffic, and endurance

> **💡 Open Source**: The benchmarking tool is completely open source! Feel free to submit pull requests if you think anything is missing or could be improved.

---

## Prerequisites

Before running benchmarks, ensure you have:

- **Go 1.26.1+** installed on your testing machine
- **Bifrost instance** running and accessible
- **Target API providers** configured (OpenAI, Anthropic, etc.)
- **Network access** between benchmark tool and Bifrost
- **Sufficient resources** on the testing machine to generate load

---

## Quick Start

### **1. Clone the Repository**

```bash
git clone https://github.com/maximhq/bifrost-benchmarking.git
cd bifrost-benchmarking
```

### **2. Build the Benchmark Tool**

```bash
go build benchmark.go
```

This creates a `benchmark` executable (or `benchmark.exe` on Windows).

### **3. Run Your First Benchmark**

```bash
# Basic benchmark: 500 RPS for 10 seconds
./benchmark -provider bifrost -port 8080

# Custom benchmark: 1000 RPS for 30 seconds  
./benchmark -provider bifrost -port 8080 -rate 1000 -duration 30 -output my_results.json
```

---

## Configuration Options

The benchmark tool offers extensive configuration through command-line flags:

### **Basic Configuration**

| Flag | Required | Description | Default |
|------|----------|-------------|---------|
| `-provider <name>` | ✅ | Provider name (e.g., `bifrost`, `litellm`) | None |
| `-port <number>` | ✅ | Port number of your Bifrost instance | None |
| `-endpoint <path>` | ❌ | API endpoint path | `v1/chat/completions` |
| `-rate <number>` | ❌ | Requests per second | `500` |
| `-duration <seconds>` | ❌ | Test duration in seconds | `10` |
| `-output <filename>` | ❌ | Results output file | `results.json` |

### **Advanced Configuration**

| Flag | Description | Default |
|------|-------------|---------|
| `-include-provider-in-request` | Include provider name in request payload | `false` |
| `-big-payload` | Use larger, more complex request payloads | `false` |

---

## Benchmark Scenarios

### **1. Basic Performance Test**

Test standard performance with typical request sizes:

```bash
./benchmark -provider bifrost -port 8080 -rate 1000 -duration 60 -output basic_test.json
```

**Use Case**: General performance validation

### **2. High-Load Stress Test**

Push your instance to its limits:

```bash
./benchmark -provider bifrost -port 8080 -rate 5000 -duration 120 -output stress_test.json
```

**Use Case**: Capacity planning and SLA validation

### **3. Large Payload Test**

Test with bigger request/response sizes:

```bash
./benchmark -provider bifrost -port 8080 -rate 500 -duration 60 -big-payload=true -output large_payload.json
```

**Use Case**: Document processing, code generation workloads

### **4. Endurance Test**

Long-running stability test:

```bash
./benchmark -provider bifrost -port 8080 -rate 1000 -duration 1800 -output endurance_test.json
```

**Use Case**: Production readiness validation (30-minute test)

### **5. Comparative Benchmarking**

Compare Bifrost against other providers:

```bash
# Test Bifrost
./benchmark -provider bifrost -port 8080 -rate 1000 -duration 60 -output bifrost_results.json

# Test LiteLLM
./benchmark -provider litellm -port 8000 -rate 1000 -duration 60 -output litellm_results.json

# Test direct OpenAI (if available)
./benchmark -provider openai -port 443 -endpoint chat/completions -rate 1000 -duration 60 -output openai_results.json
```

---

## Understanding Results

The benchmark tool generates detailed JSON results with comprehensive metrics:

### **Key Metrics Explained**

```json
{
  "bifrost": {
    "request_counts": {
      "total_sent": 30000,
      "successful": 30000,
      "failed": 0
    },
    "success_rate": 100.0,
    "latency_metrics": {
      "mean_ms": 245.5,
      "p50_ms": 230.2,
      "p99_ms": 520.8,
      "max_ms": 845.3
    },
    "throughput_rps": 5000.0,
    "memory_usage": {
      "before_mb": 512.5,
      "after_mb": 1312.8,
      "peak_mb": 1405.2,
      "average_mb": 1156.7
    },
    "timestamp": "2025-01-14T10:30:00Z",
    "status_codes": {
      "200": 30000
    }
  }
}
```

### **Critical Performance Indicators**

**Success Rate:**
- **Target**: >99.9% for production readiness
- **Excellent**: 100% (perfect reliability)

**Latency Metrics:**
- **P50 (Median)**: Typical user experience
- **P99**: Worst-case user experience  
- **Mean**: Overall average performance

**Memory Usage:**
- **Peak**: Maximum memory consumption
- **Average**: Sustained memory usage
- **After - Before**: Memory growth during test

---

## Instance Sizing Recommendations

Based on your benchmark results, use these guidelines for production sizing:

### **Resource Planning Matrix**

| Target RPS | Memory Usage | Recommended Instance | Notes |
|------------|--------------|---------------------|--------|
| **< 1,000** | < 1GB | t3.small | Cost-effective for light loads |
| **1,000 - 3,000** | 1-2GB | t3.medium | Balanced performance/cost |
| **3,000 - 5,000** | 2-4GB | t3.large | High-performance production |
| **5,000+** | 3-6GB | t3.xlarge+ | Enterprise/mission-critical |

### **Configuration Tuning Based on Results**

**If seeing high latency:**
- Increase `initial_pool_size`
- Increase `buffer_size`
- Consider larger instance

**If memory usage is high:**
- Decrease `initial_pool_size`
- Optimize `buffer_size`
- Monitor for memory leaks

**If success rate < 100%:**
- Reduce request rate
- Increase timeout settings
- Check provider limits

---

## Advanced Testing Scenarios

### **Burst Load Testing**

Simulate traffic spikes:

```bash
# Normal load
./benchmark -provider bifrost -port 8080 -rate 1000 -duration 300 -output normal_load.json

# Burst load (simulate 5x spike)
./benchmark -provider bifrost -port 8080 -rate 5000 -duration 60 -output burst_load.json
```

### **Multi-Instance Testing**

Test horizontal scaling:

```bash
# Instance 1
./benchmark -provider bifrost-1 -port 8080 -rate 2500 -duration 120 -output instance_1.json &

# Instance 2  
./benchmark -provider bifrost-2 -port 8081 -rate 2500 -duration 120 -output instance_2.json &

# Wait for both to complete
wait
```

### **Different Payload Sizes**

Compare performance across payload sizes:

```bash
# Small payloads (default)
./benchmark -provider bifrost -port 8080 -rate 1000 -duration 60 -output small_payload.json

# Large payloads
./benchmark -provider bifrost -port 8080 -rate 1000 -duration 60 -big-payload=true -output large_payload.json
```

---

## Continuous Benchmarking

### **Automated Testing Pipeline**

Set up regular performance regression testing:

```bash
#!/bin/bash
# daily_benchmark.sh

DATE=$(date +%Y%m%d_%H%M%S)
OUTPUT_DIR="benchmarks/$DATE"
mkdir -p $OUTPUT_DIR

# Run standard benchmarks
./benchmark -provider bifrost -port 8080 -rate 1000 -duration 300 -output "$OUTPUT_DIR/standard.json"
./benchmark -provider bifrost -port 8080 -rate 3000 -duration 180 -output "$OUTPUT_DIR/high_load.json"  
./benchmark -provider bifrost -port 8080 -rate 500 -duration 600 -big-payload=true -output "$OUTPUT_DIR/large_payload.json"

echo "Benchmarks completed: $OUTPUT_DIR"
```

### **Performance Monitoring Integration**

Monitor key metrics over time:
- **Success rate trends**
- **Latency percentile changes**
- **Memory usage patterns**
- **Throughput capacity**

---

## Troubleshooting

### **Common Issues**

**Connection Refused:**
```bash
# Check if Bifrost is running
curl http://localhost:8080/health

# Verify port configuration
netstat -an | grep 8080
```
- Check PORT is defined in `.env` file at root.

**High Error Rates:**
- Check provider API key limits
- Verify Bifrost configuration
- Monitor upstream provider status
- Reduce request rate for baseline test

**Memory Issues:**
- Monitor system resources during testing
- Check for memory leaks in long tests
- Adjust Bifrost pool sizes

**Inconsistent Results:**
- Run multiple test iterations
- Account for network variability  
- Use longer test durations (60+ seconds)
- Isolate testing environment
- Try hitting gateway requests to a Mock provider

---

## Next Steps

### **After Running Benchmarks**

1. **Analyze Results**: Compare against [official benchmarks](./getting-started)
2. **Optimize Configuration**: Tune based on your specific results
3. **Plan Capacity**: Size instances based on measured performance
4. **Set Up Monitoring**: Track key metrics in production

### **Compare Results**

- **[t3.medium Performance](./t3.medium)** - Compare against medium instance results
- **[t3.xlarge Performance](./t3.xl)** - Compare against high-performance configuration

**Ready to benchmark? Clone the [repository](https://github.com/maximhq/bifrost-benchmarking) and start testing!**
