---
title: "v1.2.23"
description: "v1.2.23 changelog"
---
<Tabs>
  <Tab title="NPX">
    ```bash
    npx -y @maximhq/bifrost --transport-version v1.2.23
    ```
  </Tab>
  <Tab title="Docker">
    ```bash
    docker pull maximhq/bifrost:v1.2.23
    docker run -p 8080:8080 maximhq/bifrost:v1.2.23
    ```
  </Tab>
</Tabs>

<Update label="Bifrost(HTTP)" description="v1.2.23">

- Fix: Fixes editing experience of weight for API keys.

</Update>
<Update label="Core" description="v1.2.23">

- Fix: Updates token calculation for streaming responses. #520

</Update>
<Update label="Framework" description="v1.2.23">

- upgrade: core upgrades to 1.1.38

</Update>
<Update label="governance" description="v1.2.23">

- upgrade: core to 1.1.38
- upgrade: framework to 1.0.24

</Update>
<Update label="jsonparser" description="v1.2.23">

- upgrade: core to 1.1.38
- upgrade: framework to 1.0.24

</Update>
<Update label="logging" description="v1.2.23">

- fix: fixes error logging for streaming and non-streaming responses.
- upgrade: core to 1.1.38
- upgrade: framework to 1.0.24

</Update>
<Update label="maxim" description="v1.2.23">

- upgrade: core to 1.1.38
- upgrade: framework to 1.0.24

</Update>
<Update label="mocker" description="v1.2.23">

- upgrade: core to 1.1.38
- upgrade: framework to 1.0.24

</Update>
<Update label="semantic_cache" description="v1.2.23">

- upgrade: core to 1.1.38
- upgrade: framework to 1.0.24

</Update>
<Update label="telemetry" description="v1.2.23">

- upgrade: core to 1.1.38
- upgrade: framework to 1.0.24

</Update>
