---
title: "v1.3.60"
description: "v1.3.60 changelog - 2026-01-07"
---
<Tabs>
  <Tab title="NPX">
    ```bash
    npx -y @maximhq/bifrost --transport-version v1.3.60
    ```
  </Tab>
  <Tab title="Docker">
    ```bash
    docker pull maximhq/bifrost:v1.3.60
    docker run -p 8080:8080 maximhq/bifrost:v1.3.60
    ```
  </Tab>
</Tabs>

<Update label="Bifrost(HTTP)" description="1.3.60">
- feat: remove restart required for auth config changes
- fix: resolved issue where new auth configs were not being created
- ci: added workflow to auto-generate openapi.json documentation when openapi yaml files change

</Update>
<Update label="Framework" description="1.1.59">
- feat: added flush session functionality to config store to clear all existing sessions

</Update>
<Update label="governance" description="1.3.60">
- chore: update framework version to 1.1.59

</Update>
<Update label="jsonparser" description="1.3.60">
- chore: update framework version to 1.1.59

</Update>
<Update label="logging" description="1.3.60">
- chore: update framework version to 1.1.59

</Update>
<Update label="maxim" description="1.4.61">
- chore: update framework version to 1.1.59

</Update>
<Update label="otel" description="1.0.59">
- chore: update framework version to 1.1.59

</Update>
<Update label="semantic_cache" description="1.3.59">
- chore: update framework version to 1.1.59

</Update>
<Update label="telemetry" description="1.3.59">
- chore: update framework version to 1.1.59

</Update>
