---
title: "v1.3.61"
description: "v1.3.61 changelog - 2026-01-07"
---
<Tabs>
  <Tab title="NPX">
    ```bash
    npx -y @maximhq/bifrost --transport-version v1.3.61
    ```
  </Tab>
  <Tab title="Docker">
    ```bash
    docker pull maximhq/bifrost:v1.3.61
    docker run -p 8080:8080 maximhq/bifrost:v1.3.61
    ```
  </Tab>
</Tabs>

<Update label="Bifrost(HTTP)" description="1.3.61">
- fix: image url and input audio handling in gemini chat converters
- fix: support both responseJsonSchema and responseSchema for JSON response formatting in gemini
- chore: upgrades core to v1.2.48 and framework to 1.1.60

</Update>
<Update label="Core" description="1.2.48">
- fix: image url and input audio handling in gemini chat converters
- fix: support both responseJsonSchema and responseSchema for JSON response formatting in gemini

</Update>
<Update label="Framework" description="1.1.60">
- chore: upgrades core to v1.2.48

</Update>
<Update label="governance" description="1.3.61">
- chore: upgrades core to v1.2.48 and framework to 1.1.60

</Update>
<Update label="jsonparser" description="1.3.61">
- chore: upgrades core to v1.2.48 and framework to 1.1.60

</Update>
<Update label="logging" description="1.3.61">
- chore: upgrades core to v1.2.48 and framework to 1.1.60

</Update>
<Update label="maxim" description="1.4.62">
- chore: upgrades core to v1.2.48 and framework to 1.1.60

</Update>
<Update label="mocker" description="1.3.59">
- chore: upgrades core to v1.2.48 and framework to 1.1.60

</Update>
<Update label="otel" description="1.0.60">
- chore: upgrades core to v1.2.48 and framework to 1.1.60

</Update>
<Update label="semantic_cache" description="1.3.60">
- chore: upgrades core to v1.2.48 and framework to 1.1.60

</Update>
<Update label="telemetry" description="1.3.60">
- chore: upgrades core to v1.2.48 and framework to 1.1.60

</Update>
