---
title: "v1.3.8"
description: "v1.3.8 changelog"
---
<Tabs>
  <Tab title="NPX">
    ```bash
    npx -y @maximhq/bifrost --transport-version v1.3.8
    ```
  </Tab>
  <Tab title="Docker">
    ```bash
    docker pull maximhq/bifrost:v1.3.8
    docker run -p 8080:8080 maximhq/bifrost:v1.3.8
    ```
  </Tab>
</Tabs>

<Update label="Bifrost(HTTP)" description="v1.3.8">

- chore: version update core to 1.2.12 and framework to 1.1.14
- fix: openai specific parameters filtered for openai compatibile providers
- fix: error response unmarshalling for gemini provider

</Update>
<Update label="Core" description="v1.3.8">

- fix: openai specific parameters filtered for openai compatibile providers
- fix: error response unmarshalling for gemini provider
- BREAKING FIX: json_schema field correctly renamed to schema; ResponsesTextConfigFormatJSONSchema restructured

</Update>
<Update label="Framework" description="v1.3.8">

- chore: version update core to 1.2.12

</Update>
<Update label="governance" description="v1.3.8">

- chore: version update core to 1.2.12 and framework to 1.1.14

</Update>
<Update label="jsonparser" description="v1.3.8">

- chore: version update core to 1.2.12 and framework to 1.1.14

</Update>
<Update label="logging" description="v1.3.8">

- chore: version update core to 1.2.12 and framework to 1.1.14

</Update>
<Update label="maxim" description="v1.3.8">

- chore: version update core to 1.2.12 and framework to 1.1.14

</Update>
<Update label="mocker" description="v1.3.8">

- chore: version update core to 1.2.12 and framework to 1.1.14

</Update>
<Update label="otel" description="v1.3.8">

- chore: version update core to 1.2.12 and framework to 1.1.14

</Update>
<Update label="semantic_cache" description="v1.3.8">

- chore: version update core to 1.2.12 and framework to 1.1.14

</Update>
<Update label="telemetry" description="v1.3.8">

- chore: version update core to 1.2.12 and framework to 1.1.14

</Update>
