---
title: "v1.4.0-prerelease9"
description: "v1.4.0-prerelease9 changelog - 2026-01-11"
---
<Tabs>
  <Tab title="NPX">
    ```bash
    npx -y @maximhq/bifrost --transport-version v1.4.0-prerelease9
    ```
  </Tab>
  <Tab title="Docker">
    ```bash
    docker pull maximhq/bifrost:v1.4.0-prerelease9
    docker run -p 8080:8080 maximhq/bifrost:v1.4.0-prerelease9
    ```
  </Tab>
</Tabs>

<Update label="Bifrost(HTTP)" description="1.4.0-prerelease9">
- fix: handles client disconnects and server timeouts gracefully for streaming responses

</Update>
<Update label="Core" description="1.3.8">
- fix: adds timeout and connection disconnect handling for streaming responses

</Update>
<Update label="Framework" description="1.2.8">
- chore: updated core version to 1.3.8

</Update>
<Update label="governance" description="1.4.9">
- chore: updated core version to 1.3.8 and framework version to 1.2.8

</Update>
<Update label="jsonparser" description="1.4.8">
- chore: updated core version to 1.3.8 and framework version to 1.2.8

</Update>
<Update label="logging" description="1.4.8">
- chore: updated core version to 1.3.8 and framework version to 1.2.8

</Update>
<Update label="maxim" description="1.5.8">
- chore: updated core version to 1.3.8 and framework version to 1.2.8

</Update>
<Update label="mocker" description="1.4.8">
- chore: updated core version to 1.3.8 and framework version to 1.2.8

</Update>
<Update label="otel" description="1.1.8">
- chore: updated core version to 1.3.8 and framework version to 1.2.8

</Update>
<Update label="semantic_cache" description="1.4.8">
- chore: updated core version to 1.3.8 and framework version to 1.2.8

</Update>
<Update label="telemetry" description="1.4.9">
- chore: updated core version to 1.3.8 and framework version to 1.2.8

</Update>
